\documentclass{beamer}

%\usertheme{Madrid}
\setbeamercovered{transparent}
\setcounter{tocdepth}{2}
\usepackage[french]{babel}
%\usepackage[utf8,utf8x]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{xunicode} %Unicode extras!
\usepackage{xltxtra}  %Fixes
\setmainfont{CaviarDreams}
\usepackage{multicol}
%\usepackage{colortbtl}
\usepackage{graphicx}
\usepackage{verbatim}            % Pour l'insertion de fichier en mode verbatim
\usepackage{ucs}
\usepackage{tabto}
\usepackage{xcolor}
\usepackage{hyperref}
\usepackage{hyperxmp}
\hypersetup{%
 colorlinks=true,linkcolor=blue,urlcolor=blue,pdfpagemode=UseNone,
 pdftitle={Scribe Horus},
 pdfkeywords={distribution, GNU, linux, eole, éducation, nationale, ubuntu},
 pdfauthor={Emmanuel Garette},
 pdflang={fr-FR},
 pdfcopyright={Copyright © 2011-2014 Cadoles}, % Nécessite XeTeX
 pdflicenseurl={http://creativecommons.org/licenses/by-nc-sa/2.0/fr/},
}
%\usecolortheme{crane}
\definecolor{UniBlue}{RGB}{83,121,180}
\definecolor{CleanWhite}{RGB}{255,255,255}
\setbeamercolor{title}{fg=UniBlue}
\setbeamercolor{frametitle}{fg=CleanWhite}
\setbeamercolor{structure}{fg=UniBlue}
\newcommand{\eolesmall}{
 \begin{minipage}[c]{0.10\textwidth}
  \includegraphics[width=1cm]{beamer-skel/img/logo-eole.png}
 \end{minipage}
}
\newcommand{\eolebig}{\includegraphics[width=2cm]{beamer-skel/img/logo-eole.png}}
\newcommand{\eolefull}{\includegraphics{beamer-skel/img/logo-eole.png}}
%\setmonofont[Scale=0.86]{Andale Mono}
%\usepackage{colortab}

\setbeamertemplate{background}{\includegraphics[width=128mm]{beamer-skel/img/banner01.png}}

\title[]{Formation Scribe Horus}
\subtitle{XXX CLIENT XXX}

\author[Equipe Auteur]{XXX AUTEUR XXX}

\institute[Cadoles]{\includegraphics[width=2cm]{beamer-skel/img/logo-cadoles-01.png}}

\date{{\small \today}}

\subject{Talks}

\AtBeginSubsection[]
{
 \begin{frame}<beamer>
  \frametitle{}
  \tableofcontents[currentsection,currentsubsection]
 \end{frame}
}

\logo{
 % \includegraphics[width=1cm]{beamer-skel/img/logo-ecologie.png}~
 \hspace{120pt}
 \includegraphics[width=2cm]{beamer-skel/img/logo-cadoles-01.png}~
 \hspace{113pt}
 \includegraphics[width=1cm]{beamer-skel/img/logo_en.jpg}~
}

\begin{document}

% Page de titre
\begin{frame}
\titlepage
\end{frame}

\section{Introduction}
\begin{frame}{Plan}
 \begin{columns}[t]
  \begin{column}{5cm}
   \tableofcontents[sections={1-6},currentsection, hideothersubsections]
  \end{column}
  \begin{column}{5cm}
   \tableofcontents[sections={7-12},currentsection,hideothersubsections]
  \end{column}
 \end{columns}
\end{frame}
\include{modules_EOLE_envole/commun/00-intro}
\include{modules_EOLE_envole/commun/01-nouveaute23}
\include{modules_EOLE_envole/commun/01-nouveaute24}
\include{modules_EOLE_envole/scribe/00-description}
\include{modules_EOLE_envole/horus/00-description}

\section{Les quatre phases}
\begin{frame}{Plan}
 \begin{columns}[t]
  \begin{column}{5cm}
   \tableofcontents[sections={1-6},currentsection, hideothersubsections]
  \end{column}
  \begin{column}{5cm}
   \tableofcontents[sections={7-12},currentsection,hideothersubsections]
  \end{column}
 \end{columns}
\end{frame}
\include{modules_EOLE_envole/commun/02-quatre_phases}
\include{modules_EOLE_envole/scribe/00-virtualbox}
\include{modules_EOLE_envole/commun/02-quatre_phases-pratique}
\include{modules_EOLE_envole/commun/02-instance-reconfigure}
\include{modules_EOLE_envole/commun/03-mise-a-jour}
\include{modules_EOLE_envole/commun/04-diagnose}
\include{modules_EOLE_envole/commun/04-diagnose-pratique}

\section{Utilisateurs}
\begin{frame}{Plan}
 \begin{columns}[t]
  \begin{column}{5cm}
   \tableofcontents[sections={1-6},currentsection, hideothersubsections]
  \end{column}
  \begin{column}{5cm}
   \tableofcontents[sections={7-12},currentsection,hideothersubsections]
  \end{column}
 \end{columns}
\end{frame}
\include{modules_EOLE_envole/scribe/01-utilisateur}
\include{modules_EOLE_envole/horus/01-utilisateur}

\section{Machines}
\begin{frame}{Plan}
 \begin{columns}[t]
  \begin{column}{5cm}
   \tableofcontents[sections={1-6},currentsection, hideothersubsections]
  \end{column}
  \begin{column}{5cm}
   \tableofcontents[sections={7-12},currentsection,hideothersubsections]
  \end{column}
 \end{columns}
\end{frame}
\include{modules_EOLE_envole/scribe/10-machine_conf_reseau}
\include{modules_EOLE_envole/scribe/11-integration-scribe}
\include{modules_EOLE_envole/horus/11-integration-horus}
\include{modules_EOLE_envole/scribe/12-machine-ead}
\include{modules_EOLE_envole/horus/02-machine-ead}
\include{modules_EOLE_envole/scribe/12-machine-diagnostic}
\include{modules_EOLE_envole/scribe/13-profil}
\include{modules_EOLE_envole/scribe/14-esu}
\include{modules_EOLE_envole/horus/14-esu}
\include{modules_EOLE_envole/scribe/15-script-scribe}
\include{modules_EOLE_envole/horus/15-script-horus}
\include{modules_EOLE_envole/scribe/10-windows-distance}
\include{modules_EOLE_envole/scribe/16-imprimante}
\include{modules_EOLE_envole/scribe/17-corbeille}
\include{modules_EOLE_envole/scribe/18-virus}
\include{modules_EOLE_envole/scribe/19-ftp}

\section{Sauvegarde}
\begin{frame}{Plan}
 \begin{columns}[t]
  \begin{column}{5cm}
   \tableofcontents[sections={1-6},currentsection, hideothersubsections]
  \end{column}
  \begin{column}{5cm}
   \tableofcontents[sections={7-12},currentsection,hideothersubsections]
  \end{column}
 \end{columns}
\end{frame}
\include{modules_EOLE_envole/scribe/20-sauvegarde}

\section{Communications}
\begin{frame}{Plan}
 \begin{columns}[t]
  \begin{column}{5cm}
   \tableofcontents[sections={1-6},currentsection, hideothersubsections]
  \end{column}
  \begin{column}{5cm}
   \tableofcontents[sections={7-12},currentsection,hideothersubsections]
  \end{column}
 \end{columns}
\end{frame}
\include{modules_EOLE_envole/scribe/30-communication}

\section{Les scripts administratifs}
\begin{frame}{Plan}
 \begin{columns}[t]
  \begin{column}{5cm}
   \tableofcontents[sections={1-6},currentsection, hideothersubsections]
  \end{column}
  \begin{column}{5cm}
   \tableofcontents[sections={7-12},currentsection,hideothersubsections]
  \end{column}
 \end{columns}
\end{frame}
\include{modules_EOLE_envole/horus/03-administratifs}

\section{Les services web}
\begin{frame}{Plan}
 \begin{columns}[t]
  \begin{column}{5cm}
   \tableofcontents[sections={1-6},currentsection, hideothersubsections]
  \end{column}
  \begin{column}{5cm}
   \tableofcontents[sections={7-12},currentsection,hideothersubsections]
  \end{column}
 \end{columns}
\end{frame}
%\include{modules_EOLE_envole/tronc-commun-1/30-ead}
\include{modules_EOLE_envole/envole/01-ajout}
\include{modules_EOLE_envole/envole/02-applications}
\include{modules_EOLE_envole/envole/02-posh}

\subject{Talks}
\begin{frame}
 \frametitle{Licence}
 Cette œuvre est mise à disposition sous licence \href{http://creativecommons.org/licenses/by-nc-sa/2.0/fr/}{\textsc{cc-by-nc-sa-2.0}}
 \begin{itemize}
  \item Attribution
  \item Pas d’Utilisation Commerciale
  \item Partage dans les Mêmes Conditions 2.0
  \item France
 \end{itemize}
 Pour voir une copie de cette licence, visitez
 \href{http://creativecommons.org/licenses/by-nc-sa/2.0/fr/}{http://creativecommons.org/licenses/by-nc-sa/2.0/fr/}
 ou écrivez à Creative Commons, 444 Castro Street, Suite 900,
 Mountain View, California, 94041, USA.
\end{frame}

\end{document}

